h3 Entries 492528 Mean 0.004301 RMS 0.04045

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

100

200

300

400

500 310 × KS prob,0-1000 events, Boris: T = 10MeV