h3 Entries 499500 Mean 0.1576 RMS 0.25

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 20 40 60 80 100 120 140 160 180 200 220 310 × KS prob,0-1000 events, Boris: T = 175MeV